DROP TABLE IF EXISTS `phpcms_comment`;
CREATE TABLE IF NOT EXISTS `phpcms_comment` (
  `commentid` char(30) NOT NULL,
  `siteid` smallint(5) NOT NULL DEFAULT '0',
  `title` char(255) NOT NULL,
  `url` char(255) NOT NULL,
  `total` int(8) unsigned DEFAULT '0',
  `square` mediumint(8) unsigned DEFAULT '0',
  `anti` mediumint(8) unsigned DEFAULT '0',
  `neutral` mediumint(8) unsigned DEFAULT '0',
  `display_type` tinyint(1) DEFAULT '0',
  `tableid` mediumint(8) unsigned DEFAULT '0',
  `lastupdate` int(10) unsigned DEFAULT '0',
  PRIMARY KEY (`commentid`),
  KEY `lastupdate` (`lastupdate`),
  KEY `siteid` (`siteid`)
) TYPE=MyISAM;